"Satellite Display"
"D.H.2"
"Information is available for display in several ways.  Output to the"
"screen occurs each time this function is selected.  The information can"
"also be sent to a printer or sent to a text file in the current directory."
"Press F10, then press P for output to a printer or D for output to a disk."
"The printer must be connected to LPT1.  The text file will be sent to the"
"current directory as SATFILE.TXT."
"The available display functions are shown at the bottom of the screen."
"Press ESCape from Satellite Display to return to the Main Menu."

